en	Multi-factor Authentication Overview

en	Active

en	Locked

en	Default provider

en	Unlock %s

en	Unlock

en	Edit %s

en	Edit / Change

en	Deactivate %s

en	Deactivate

en	Setup %s

en	Setup

en	Multi-factor authentication required

en	Your installation requires MFA. Therefore please setup one of the following providers to be able to continue to use the backend.

en	No multi-factor authentication providers

en	There are currently no multi-factor authentication providers available.

en	You are required to setup MFA but there are no providers to activate available. You should contact your administrator to solve this.

en	Selected MFA provider was not found!

en	Selected MFA provider has to be active to perform this action!

en	Selected MFA provider has to be inactive to perform this action!

en	Selected MFA provider has to be unlocked to perform this action!

en	Setup instructions

en	Close setup instructions

en	Set up %s

en	Edit %s

en	Default provider

en	Select this as your default provider for login into the TYPO3 backend.

en	Use as default provider

en	Deactivate provider

en	If you don't want to use this provider anymore, you can deactivate it here.

en	Deactivate %s

en	Deactivate this provider

en	Could not activate MFA provider %s. Please try again.

en	Successfully activated MFA provider %s.

en	Could not deactivate MFA provider %s. Please try again.

en	Successfully deactivated MFA provider %s.

en	Could not unlock MFA provider %s. Please try again.

en	Successfully unlocked MFA provider %s.

en	Could not update MFA provider %s. Please try again.

en	Successfully updated MFA provider %s.

en	Authentication was not successful.

en	Verify

en	Go back

en	This provider is locked. Unlocking may require administrative intervention. Recovery codes can be used to circumvent the lock.

en	Alternative providers

en	Use %s

en	Set up %s

en	Set up MFA

en	%s requires you setting up MFA to secure your account. Please select one of the available providers below.

en	You are required to set up MFA. However, there are no MFA providers available for you to use. This might be a misconfiguration. Please get in touch with your administrator to find a solution.

en	Go back

en	Setup

en	Cancel

en	MFA setup successful

en	You have successfully activated MFA provider %s. This provider was also automatically set as your default provider. You can change this at any time in your user settings.

en	Success

en	An error occurred

en	Invalid request could not be processed

en	Your are not allowed to perform this action

en	No provider has been deactivated

en	Successfully deactivated all active providers for user %s

en	Provider %s could not be found

en	Could not deactivate provider %s

en	Successfully deactivated provider %s for user %s