en	Log Out

en	What is OpenId?

en	Backend,Front End,Traditional Backend

en	Login to the TYPO3 CMS Backend on ###SITENAME###

en	This is the backend login of TYPO3. You need username and password to access this administration interface. If you are a visitor of ###SITENAME###, please visit the public website: ###SITELINK###

en	Reset this form

en	(Note: Cookies and JavaScript must be enabled!)

en	Clear this field!

en	Unsupported Browser

en	You are using an unsupported browser version.

en	Please install <a href="http://www.microsoft.com/internetexplorer/" target="_blank" rel="noreferrer" />a more modern browser version</a>.

en	Important Messages

en	Your login attempt did not succeed. Make sure to spell your username and password correctly, including upper/lowercase characters.

en	Ignore!

en	For more information or further help click here

en	Warranty is supplied by %s; %sdetails about licences.%s

en	TYPO3 CMS comes with ABSOLUTELY NO WARRANTY; %sdetails about licences.%s

en	TYPO3 CMS

en	TYPO3 CMS logo

en	ver.

en	Copyright

en	Extensions are copyright of their respective owners.

en	Go to %s for details.

en	This is free software, and you are welcome to redistribute it under certain conditions; %sdetails about licences.%s

en	Obstructing the appearance of this notice is prohibited by law.